LED resistors all 1k

LEDs: X,Y,Z addresses

Digital to Analog Conv. all resistors 10k

Stereoscopic 8x8x8 Scope Display

All transistors are 2n2222

Horiz. Rotate

Vert. Rotate

Daren Scot Wilson June 8th, 1979 redrawn in 2009

LPF for L/R perspective difference

stereo888xy.rb dswschem.rb dswschem.ps